� Introduction

Recherche de Squarks

Conservation de la R-parite ~q → q^~χo1

• Introduction • Recherche du Sbottom :^~b1 → b^~χo1.

• Accord DATA-MC. • Réseau de neurones. • Limites d’exclusion.

• Recherche du Stop :^~t1 → c^~χo1.

CERN : 8 february 1999 1 Patrice VERDIER

�^~b1: Introduction

Topologies :

• 2 jets acoplanaires et énergie manquante.

Simulation du signal :

• Sbottom : SUSYGEN 2.3 • Stop : modelisation de l’hadronisation du stop (Marc Besançon).

Analyse en fenêtre de masse :

• ΔM ≥ 30 • 10 < ΔM < 30 • ΔM ≤ 10

CERN : 8 february 1999 2 Patrice VERDIER

�^~b1: MC agreement with Data

• Sélection des traces: cf. Critères de sélection pour les analyses hadroniques (Chris Parkes).

Variables ΔM > 10 ΔM ≤ 10 N_{ch. part.} ≥ 7 ≥ 5 N_{part.} ≥ 10 - E_{visible} - ≤ 50 E_{charged} - ≤ 40 √ s^′ ≤ 180 P_t jet 1 ≥ 4 - P_t jet 2 ≥ 2 - θ_{jets 1,2} - ∈ [30, 150] E_{HP C} ≤ 40 ≤ 20 E_{F EMC} ≤ 25 ≤ 10 E_{ST IC} ≤ 20 ≤ 20 E_{<30}o/E_{vis.} ≤ 0.7 E_{<30}o ≤ 50 P^{charg.} t max ≥ 1.5 - P^{miss}_t ≥ 5 - E_t ≥ 15 ≥ 6 P robz0 ≥ −2

Monte-Carlo 3217. 3111. Data 3257 2690 Efficacité moyenne sur le signal 84.7% 55.5%

CERN : 8 february 1999 3 Patrice VERDIER

�^~b1: ΔM > 10

CERN : 8 february 1999 4 Patrice VERDIER

�^~b1: ΔM ≤ 10

CERN : 8 february 1999 5 Patrice VERDIER

�^~b1: Réseau de neurones

ΔM > 30 et 10 < ΔM ≤ 30

• Nombre de noeuds en entrée : 17 • Nombre de noeuds cachés : 17 • Nombre de noeuds en sortie : 3

• Variables d’entrée : Evis, Echarg., Et, Mvis, Pt, E^{jet1}_t ,E^{jet2}_t , N^{jet1}_{charg.part.},

N^{jet2}_{charg.part.}, θ_{jet1−jet2}, θ^{trans.plane}_{jet1−jet2} , Y_2,Y_3, acolin., acoplan., probz0, probz0^{durham}

2jets .

• sortie :

Noeud de sortie noeud 1 noeud 2 noeud 3 Signal 1 0 0 qq̄γ W^+W^− Z^oZ^o 0 1 0 W^±eν ννqq γγQCD γγQP M 0 0 1

Chaque fenêtre de masse est entrainée avec les points du signal lui appartenant.

CERN : 8 february 1999 6 Patrice VERDIER

�^~b1: Réseau de neurones

ΔM ≤ 10

• Nombre de noeuds en entrée : 9 • Nombre de noeuds cachés : 9 • Nombre de noeuds en sortie : 1 • Variables d’entrée : Et,Pt, Y2,θjet1, θjet2, acolin., acoplan.,probz0,

probz0^{durham}

2jets .

• Sortie :

Noeud de sortie noeud 1 Signal 1 γγQCD γγQP M 0

CERN : 8 february 1999 7 Patrice VERDIER

�^~b1: Optimisation de la coupure

CERN : 8 february 1999 8 Patrice VERDIER

�^~b1: Résultats

ΔM > 30 10 < ΔM ≤ 30 ΔM ≤ 10 Coupure SNNS 0.995 0.99 0.955 Ndata 0 0 1 Nmonte-carlo 0.89 1.29 3.34

qq̄γ γγ Z^oZ^o ννqq W^±eν ΔM > 30 0.263 0.330 0.123 0.164 0.010 10 < ΔM ≤ 30 0.482 0.660 0.055 0.071 0.026 ΔM ≤ 10 0.310 2.99 0.010 0.021 0.015

CERN : 8 february 1999 9 Patrice VERDIER

�^~b1: Résultats

ΔM ≥ 15 ΔM ≥ 10 m(^~b_1) (angle de mélange nul) ≥ 89.5 ≥ 86.

m(^~b_1) (découplage au Z) ≥ 65.5 ≥ 65.5

Amélioration comparée à 183 GeV : +22 GeV

CERN : 8 february 1999 10 Patrice VERDIER

�^~b1: Results

ΔM ≥ 15

CERN : 8 february 1999 11 Patrice VERDIER

�^~t1: Résultats

ΔM > 30 10 < ΔM ≤ 30 Coupure SNNS 0.92 0.94 Ndata 3 3 Nmonte-carlo 3.20 3.26

CERN : 8 february 1999 12 Patrice VERDIER

�^~t1: Résultats

ΔM ≥ 15 m(^~t_1) (angle de mélange nul) ≥ 86.5

m(^~t_1) (découplage au Z) ≥ 80.

Amélioration comparée à 183 GeV : +11.5 GeV

CERN : 8 february 1999 13 Patrice VERDIER

� Conclusion

• Résultats : ΔM ≥ 15

angle de mélange nul découplage au Z m(^~b1) ≥ 89.5 ≥ 65.5 m(^~t1) ≥ 86.5 ≥ 80.

• A venir :

• Fonds γγ à 189 GeV.

• Analyse stop pour les ΔM ≤ 10.

• Passer l’analyse à 183 GeV pour ajouter 53 pb−1. • Optimiser le réseau de neurones pour les masses de^~b1aux environs de 70 GeV.

CERN : 8 february 1999 14 Patrice VERDIER